From 1c12d378d66b92b1674acd17640f2bac752da289 Mon Sep 17 00:00:00 2001
From: Andrew Lee <andrew@alee14.me>
Date: Tue, 25 Mar 2025 14:13:06 -0400
Subject: Converted public dashboard to admin dashboard; Made API have a
 consistent output message

---
 web/src/app/components/Navbar.jsx | 25 +++++++++++++++++++++++++
 1 file changed, 25 insertions(+)
 create mode 100644 web/src/app/components/Navbar.jsx

(limited to 'web/src/app/components/Navbar.jsx')

diff --git a/web/src/app/components/Navbar.jsx b/web/src/app/components/Navbar.jsx
new file mode 100644
index 0000000..242175c
--- /dev/null
+++ b/web/src/app/components/Navbar.jsx
@@ -0,0 +1,25 @@
+import SignOut from "@/app/components/sign-out";
+
+export default function Navbar() {
+    return (
+        <nav className="bg-gray-900 text-white">
+            <div className="max-w-screen-xl flex items-center justify-between mx-auto p-4">
+                <div className="flex items-center space-x-4">
+                    <h1 className="text-xl font-medium">AleeBot</h1>
+                    <ul>
+                        <li className="inline-block mx-2">Guilds</li>
+                        <li className="inline-block mx-2">Quotes</li>
+                        <li className="inline-block mx-2">Settings</li>
+                    </ul>
+                </div>
+
+                <div className="flex items-center space-x-4">
+                    <span>Uptime: 1 day</span>
+                    <span>API v(version)</span>
+                    <span>4.0.0 Beta</span>
+                    <SignOut />
+                </div>
+            </div>
+        </nav>
+    )
+}
-- 
cgit v1.2.3

