From 1c12d378d66b92b1674acd17640f2bac752da289 Mon Sep 17 00:00:00 2001
From: Andrew Lee <andrew@alee14.me>
Date: Tue, 25 Mar 2025 14:13:06 -0400
Subject: Converted public dashboard to admin dashboard; Made API have a
 consistent output message

---
 web/src/app/components/sign-out.jsx | 11 +----------
 1 file changed, 1 insertion(+), 10 deletions(-)

(limited to 'web/src/app/components/sign-out.jsx')

diff --git a/web/src/app/components/sign-out.jsx b/web/src/app/components/sign-out.jsx
index 69162a4..dd6693d 100644
--- a/web/src/app/components/sign-out.jsx
+++ b/web/src/app/components/sign-out.jsx
@@ -1,14 +1,5 @@
-import { signOut } from "@/lib/auth"
-
 export default function SignOut() {
     return (
-        <form
-            action={async () => {
-                "use server"
-                await signOut("discord")
-            }}
-        >
-            <button type="submit">Log out</button>
-        </form>
+        <button type="submit" className="py-2 px-4 rounded-md text-md bg-red-700 hover:bg-red-500">Sign out</button>
     )
 }
-- 
cgit v1.2.3

