From ec60958fa9485e98db1ddf4c8a36e78b77276c12 Mon Sep 17 00:00:00 2001
From: Andrew Lee <alee14498@protonmail.com>
Date: Sat, 15 Aug 2020 22:21:20 -0400
Subject: Hopefully fixed error page; Removed v-card in home and tweaks; Navbar
 tweaks

---
 layouts/error.vue | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'layouts/error.vue')

diff --git a/layouts/error.vue b/layouts/error.vue
index 27b44b9..d204d97 100644
--- a/layouts/error.vue
+++ b/layouts/error.vue
@@ -1,9 +1,9 @@
 <template>
         <v-container>
-            <h1 v-if="error.statusCode = 404">404 Error</h1>
+            <h1 v-if="error.statusCode = 404" class="display-3 text-center">404 Error</h1>
             <h1 v-else>An error occurred</h1>
-            <p>Hmm. Seems like this page either didn't exist...</p>
-            <nuxt-link to="/">Home page</nuxt-link>
+            <p class="text-center display-1">Hmm. Seems like this page either didn't exist or something went wrong...</p>
+            <p class="text-center display-1"><nuxt-link to="/">Home</nuxt-link></p>
         </v-container>
 </template>
 
-- 
cgit v1.2.3

