From 6c999c3c88e9f894fc9746e01bf22be24f351d9b Mon Sep 17 00:00:00 2001
From: Andrew Lee <alee14498@protonmail.com>
Date: Sun, 26 Jul 2020 18:16:08 -0400
Subject: Finished the projects page, changed footer

---
 pages/index.vue | 82 ++++++++++++++++++++++++++++-----------------------------
 1 file changed, 40 insertions(+), 42 deletions(-)

(limited to 'pages/index.vue')

diff --git a/pages/index.vue b/pages/index.vue
index d4936ab..0c0d98f 100644
--- a/pages/index.vue
+++ b/pages/index.vue
@@ -45,51 +45,49 @@
                     </v-container>
                 </v-card>
             </div>
-            <div class="projects">
-                <!-- This might get removed -->
-            </div>
-            <div class="blog">
-                <h1>Blog here</h1>
-            </div>
             <div class="aleepc-specs">
                 <h1>AleePC Parts</h1>
                 <v-simple-table>
-                    <tr>
-                        <th>Part Type</th>
-                        <th>Part Name</th>
-                    </tr>
-                    <tr>
-                        <td>CPU</td>
-                        <td>AMD - Ryzen 3 2200G 3.5 GHz Quad-Core Processor</td>
-                    </tr>
-                    <tr>
-                        <td>CPU Cooler</td>
-                        <td>Cooler Master - Hyper T2 54.8 CFM Sleeve Bearing CPU Cooler</td>
-                    </tr>
-                    <tr>
-                        <td>Motherboard</td>
-                        <td>ASRock - B450M-HDV Micro ATX AM4</td>
-                    </tr>
-                    <tr>
-                        <td>Memory</td>
-                        <td>Corsair - Vengeance LPX 16 GB (2 x 8 GB) DDR4-2400</td>
-                    </tr>
-                    <tr>
-                        <td>Main Storage</td>
-                        <td>Western Digital Blue 250 GB M.2-2280 Solid State Drive</td>
-                    </tr>
-                    <tr>
-                        <td>Second Storage</td>
-                        <td>Western Digital Blue 2 TB 3.5" 5400RPM Internal Hard Drive</td>
-                    </tr>
-                    <tr>
-                        <td>Case</td>
-                        <td>Rosewill - FBM-X1 MicroATX Mini Tower Case</td>
-                    </tr>
-                    <tr>
-                        <td>Power Supply</td>
-                        <td>EVGA - 500 W 80+ Certified ATX Power Supply</td>
-                    </tr>
+                    <thead>
+                        <tr>
+                            <th>Part Type</th>
+                            <th>Part Name</th>
+                        </tr>
+                    </thead>
+                    <tbody>
+                        <tr>
+                            <td>CPU</td>
+                            <td>AMD - Ryzen 3 2200G 3.5 GHz Quad-Core Processor</td>
+                        </tr>
+                        <tr>
+                            <td>CPU Cooler</td>
+                            <td>Cooler Master - Hyper T2 54.8 CFM Sleeve Bearing CPU Cooler</td>
+                        </tr>
+                        <tr>
+                            <td>Memory</td>
+                            <td>Corsair - Vengeance LPX 16 GB (2 x 8 GB) DDR4-2400</td>
+                        </tr>
+                        <tr>
+                            <td>Main Storage</td>
+                            <td>Western Digital Blue 250 GB M.2-2280 Solid State Drive</td>
+                        </tr>
+                        <tr>
+                            <td>Second Storage</td>
+                            <td>Western Digital Blue 2 TB 3.5" 5400RPM Internal Hard Drive</td>
+                        </tr>
+                        <tr>
+                            <td>Motherboard</td>
+                            <td>ASRock - B450M-HDV Micro ATX AM4</td>
+                        </tr>
+                        <tr>
+                            <td>Case</td>
+                            <td>Rosewill - FBM-X1 MicroATX Mini Tower Case</td>
+                        </tr>
+                        <tr>
+                            <td>Power Supply</td>
+                            <td>EVGA - 500 W 80+ Certified ATX Power Supply</td>
+                        </tr>
+                    </tbody>
                 </v-simple-table>
             </div>
         </v-container>
-- 
cgit v1.2.3

